0.2 0.4 0.6 0.8 1

0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

G3 Moore Rel. 7.8.0 |η|

Efficiency

0.2 0.4 0.6 0.8 1

0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

G3 Moore Rel. 7.8.0 |η|

Efficiency

0.2 0.4 0.6 0.8 1

0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

G3 Moore Rel. 7.8.0 |η|

Efficiency

0.2 0.4 0.6 0.8 1

0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

G3 Moore Rel. 7.8.0 |η|

Efficiency

0.2 0.4 0.6 0.8 1

0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

G3 Moore Rel. 7.8.0 |η|

Efficiency

0.2 0.4 0.6 0.8 1

0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

G3 Moore Rel. 7.8.0 |η|

Efficiency

0.2 0.4 0.6 0.8 1

0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

G3 Moore Rel. 7.8.0 |η|

Efficiency