0.2

0.4

0.6

0.8

1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 6 GeV

0.2

0.4

0.6

0.8

1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 20 GeV

G3 Moore780 Reco Efficiency vs phi

0.25 0.5 0.75 1

0 2 4 6

G3 Moore Rel. 7.8.0 ϕ

Efficiency p_T = 6 GeV

0.2 0.4 0.6 0.8 1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 6 GeV

0.2 0.4 0.6 0.8 1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 20 GeV

0.2 0.4 0.6 0.8 1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 100 GeV

0.2 0.4 0.6 0.8 1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 200 GeV

0.2 0.4 0.6 0.8 1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 300 GeV

0.2 0.4 0.6 0.8 1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 500 GeV

0.2 0.4 0.6 0.8 1

0 1 2 3 4 5 6

G3 Moore Rel. 7.8.0

ϕ

Efficiency p_T = 1000 GeV