afnmuo 0 100 200 300 400 500 600 700 800

0 1 2

ID Entries Mean RMS

1000000 1138 0.3413 0.4781

morenmuo 0 100 200 300 400 500 600 700 800

0 1 2

ID Entries Mean RMS

1000000 1138 0.3194 0.4653

muidnmuo 0 100 200 300 400 500 600 700 800

0 1 2

ID Entries Mean RMS

1000000 1138 0.3370 0.4782

mubxnmuo 0 100 200 300 400 500 600 700 800

0 1 2

ID Entries Mean RMS

1000000 1138 0.3387 0.4826

af pt 0 10 20 30 40 50 60

50 100 150

ID Entries Mean RMS

101 329 44.20 22.84

Moore pt 0 10 20 30 40 50

50 100 150

ID Entries Mean RMS

102 306 43.96 22.92

Muid pt 0 10 20 30 40 50

50 100 150

ID Entries Mean RMS

103 319 44.52 22.91

Muonbox pt 0 10 20 30 40 50

50 100 150

ID Entries Mean RMS

104 318 44.60 22.87

af η 0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

-2 0 2

ID Entries Mean RMS

201 329 -0.4623E-01 1.201

Moore η 0 2 4 6 8 10 12 14 16 18 20

-2 0 2

ID Entries Mean RMS

202 306 -0.5743E-01 1.252

Muid η 0 2.5 5 7.5 10 12.5 15 17.5 20

-2 0 2

ID Entries Mean RMS

203 319 -0.6912E-01 1.207

Muonbox η 0 2 4 6 8 10 12 14 16 18

-2 0 2

ID Entries Mean RMS

204 318 -0.7694E-01 1.257

20 40 60 80 100 120 140 160 180

50 100 150

aflpt VS. morelpt

ID 1000000 ENTRIES 277 0.00 0.00 0.00 0.00 277. 0.00 0.00 0.00 0.00

0 20 40 60 80 100 120 140 160 180

0 50 100 150

aflpt VS. muidlpt

ID 1000000 ENTRIES 296 0.00 0.00 0.00 0.00 296. 0.00 0.00 0.00 0.00

0 20 40 60 80 100 120 140 160 180

0 50 100 150

aflpt VS. mubxlpt

ID 1000000 ENTRIES 295 0.00 0.00 0.00 0.00 295. 0.00 0.00 0.00 0.00

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

-2 -1 0 1 2

afleta VS. moreleta

ID 1000000 ENTRIES 277 0.00 0.00 0.00 0.00 277. 0.00 0.00 0.00 0.00

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

-2 -1 0 1 2

afleta VS. muidleta

ID 1000000 ENTRIES 296 0.00 0.00 0.00 0.00 296. 0.00 0.00 0.00 0.00

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

-2 -1 0 1 2

afleta VS. mubxleta

ID 1000000 ENTRIES 295 0.00 0.00 0.00 0.00 295. 0.00 0.00 0.00 0.00

Moore-af pt 0 5 10 15 20 25 30 35

-10 -5 0 5 10

ID Entries Mean RMS

301 277 1.677 2.750

Muid-af pt 0 10 20 30 40 50

-10 -5 0 5 10

ID Entries Mean RMS

302 296 -0.6771 2.802

Muonbox-af pt 0 10 20 30 40 50 60

-10 -5 0 5 10

ID Entries Mean RMS

303 295 -0.4398 2.436

Moore-af η 0 10 20 30 40 50 60 70

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

401 277 -0.2347E-03 0.7725E-02

Muid-af η 0 10 20 30 40 50 60 70 80

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

402 296 -0.1464E-03 0.6603E-02

Muonbox-af η 0 10 20 30 40 50 60 70 80

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

403 295 -0.1073E-03 0.6642E-02

af-Moore pt 0 5 10 15 20 25 30 35

-10 -5 0 5 10

ID Entries Mean RMS

501 277 1.677 2.750

Muid-Moore pt 0 20 40 60 80 100 120

-10 -5 0 5 10

ID Entries Mean RMS

502 291 2.517 0.9541

Muonbox-Moore pt 0 10 20 30 40 50 60

-10 -5 0 5 10

ID Entries Mean RMS

503 283 2.248 2.033

af-Moore η 0 10 20 30 40 50 60 70

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

601 277 -0.2347E-03 0.7725E-02

Muid-Moore η 0 20 40 60 80 100 120

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

602 291 0.2864E-04 0.4102E-02

Muonbox-Moore η 0 20 40 60 80 100

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

603 283 -0.1001E-03 0.4790E-02