afnmuo 0 1000

2000

3000

4000

5000

6000

0 1 2

ID Entries Mean RMS

1000000 8679 0.3419 0.4825

morenmuo 0 1000

2000

3000

4000

5000

6000

0 1 2 3

ID Entries Mean RMS

1000000 8679 0.3246 0.4768

muidnmuo 0 1000

2000

3000

4000

5000

6000

0 1 2 3

ID Entries Mean RMS

1000000 8679 0.3432 0.4854

mubxnmuo 0 1000

2000

3000

4000

5000

6000

0 1 2 3

ID Entries Mean RMS

1000000 8679 0.3439 0.4873

af pt 0 50 100 150 200 250 300 350 400 450

50 100 150

ID Entries Mean RMS

101 2460 44.01 23.46

Moore pt 0 50 100 150 200 250 300 350 400

50 100 150

ID Entries Mean RMS

102 2299 44.00 23.73

Muid pt 0 50 100 150 200 250 300 350 400

50 100 150

ID Entries Mean RMS

103 2437 44.26 23.90

Muonbox pt 0 50 100 150 200 250 300 350 400

50 100 150

ID Entries Mean RMS

104 2432 44.18 23.82

af η 0 20 40 60 80 100 120 140

-2 0 2

ID Entries Mean RMS

201 2460 -0.1939E-01 1.224

Moore η 0 20 40 60 80 100 120 140

-2 0 2

ID Entries Mean RMS

202 2299 -0.3523E-01 1.287

Muid η 0 20 40 60 80 100 120 140

-2 0 2

ID Entries Mean RMS

203 2437 -0.1592E-01 1.225

Muonbox η 0 20 40 60 80 100 120 140

-2 0 2

ID Entries Mean RMS

204 2432 0.6376E-02 1.276

0 25 50 75 100 125 150 175 200 225 250

0 500 1000 1500 2000 2500

aflpt VS. morelpt

ID 1000000 ENTRIES 2067 0.00 0.00 0.00 0.00 0.207E+04 0.00 0.00 0.00 0.00

0 25 50 75 100 125 150 175 200 225 250

0 200 400 600 800

aflpt VS. muidlpt

ID 1000000 ENTRIES 2221 0.00 0.00 0.00 0.00 0.222E+04 0.00 0.00 0.00 0.00

0 25 50 75 100 125 150 175 200 225 250

0 200 400 600 800

aflpt VS. mubxlpt

ID 1000000 ENTRIES 2181 0.00 0.00 0.00 0.00 0.218E+04 0.00 0.00 0.00 0.00

-2 -1 0 1 2 3

-2 0 2

afleta VS. moreleta

ID 1000000 ENTRIES 2067 0.00 0.00 0.00 0.00 0.207E+04 0.00 0.00 0.00 0.00

-2 -1 0 1 2 3

-2 0 2

afleta VS. muidleta

ID 1000000 ENTRIES 2221 0.00 0.00 0.00 0.00 0.222E+04 0.00 0.00 0.00 0.00

-2 -1 0 1 2 3

-2 0 2

afleta VS. mubxleta

ID 1000000 ENTRIES 2181 0.00 0.00 0.00 0.00 0.218E+04 0.00 0.00 0.00 0.00

Moore-af pt 0 50 100 150 200 250 300

-10 -5 0 5 10

ID Entries Mean RMS

301 2067 2.007 2.781

Muid-af pt 0 50 100 150 200 250 300 350

-10 -5 0 5 10

ID Entries Mean RMS

302 2221 -0.2702 2.728

Muonbox-af pt 0 50 100 150 200 250 300 350 400

-10 -5 0 5 10

ID Entries Mean RMS

303 2181 -0.1184 2.472

Moore-af η 0 100 200 300 400 500

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

401 2067 -0.2094E-03 0.7828E-02

Muid-af η 0 100 200 300 400 500 600

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

402 2221 -0.6926E-04 0.7097E-02

Muonbox-af η 0 50 100 150 200 250 300

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

403 2181 0.1197E-04 0.7069E-02

af-Moore pt 0 50 100 150 200 250 300

-10 -5 0 5 10

ID Entries Mean RMS

501 2067 2.007 2.781

Muid-Moore pt 0 100 200 300 400 500 600 700 800 900

-10 -5 0 5 10

ID Entries Mean RMS

502 2215 2.488 0.9820

Muonbox-Moore pt 0 50 100 150 200 250 300 350 400 450

-10 -5 0 5 10

ID Entries Mean RMS

503 2166 2.190 2.193

af-Moore η 0 100 200 300 400 500

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

601 2067 -0.2094E-03 0.7828E-02

Muid-Moore η 0 200 400 600 800 1000

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

602 2215 -0.1061E-03 0.4114E-02

Muonbox-Moore η 0 50 100 150 200 250 300 350 400 450

-0.04 -0.02 0 0.02 0.04

ID Entries Mean RMS

603 2166 0.7414E-03 0.5194E-02