R [mm]

50 100 150 200 250 300 counts/1mm

0 200 400 600 800 1000

1200

1400

1600

1800 PADME2020_{11} 10⋅ = 430 MeV, NPOT=4

+eE_{FR∈}^T_{1,2γ , R}^T_{γR}

FR ∈ ^R_{1,2γ} , R R γR