HV / kV

0.9 1 1.1 1.2 1.3 1.4 1.5 efficiency

0

0.2

0.4

0.6

0.8

1 / ndf

2χ 65.53 / 7 Prob 1.176e-011 p0 0.003513 ± 1.016 p1 0.001902 ± 1.245 p2 0.004351 ± 0.2278 ± ± ± scintillatore n. 5 - discrimination thr. 18 mV