HV / kV

0.9 1 1.1 1.2 1.3 1.4 1.5 efficiency

0

0.1

0.2

0.3

0.4

0.5 / ndf

2χ 3.881 / 6 Prob 0.6928 p0 0.01307 ± 0.5443 p1 0.003445 ± 1.324 p2 0.006363 ± 0.1751 ± ± ± scintillatore n. 8 - discrimination thr. 18 mV