HV / kV

0.9 1 1.1 1.2 1.3 1.4 1.5 efficiency

0

0.1

0.2

0.3

0.4

0.5

/ ndf

2χ 64.26 / 6 Prob 6.112e-012 p0 0.006562 ± 0.4744 p1 0.0001814 ± 1.3 p2 0.00459 ± 0.1459 ± ± ± scintillatore n. 8 - discrimination thr. 18 mV