HV / kV

0.9 1 1.1 1.2 1.3 1.4 1.5 efficiency

0

0.1

0.2

0.3

0.4

0.5 / ndf 2χ 9.825 / 8 Prob 0.2775 p0 0.007213 ± 0.5222 p1 0.002665 ± 1.283 p2 0.005574 ± 0.18

/ ndf ± ± ± scintillatore n. 9 - discrimination thr. 18 mV