) - deformed •, - original • cpl_x=1 (

Z -1500 -1000 -500

Y

6913.4

6913.45

6913.5

6913.55 Center, Y%Z

Z -1500 -1000 -500

Y

6913.4

6913.45

6913.5

6913.55 RO end, Y%Z

Z -1500 -1000 -500

X

-0.1

-0.05

0

0.05

0.1 Center, X%Z

Z -1500 -1000 -500

X

-1748.85

-1748.8

-1748.75

-1748.7

-1748.65 RO end, X%Z

Y 6913.4 6913.45 6913.5 6913.55

X

-0.1

-0.05

0

0.05

0.1 Center, X%Y

Y 6913.4 6913.45 6913.5 6913.55

X

-1748.85

-1748.8

-1748.75

-1748.7

-1748.65 RO end, X%Y